ALTER table wms_storage MODIFY column header_no VARCHAR(128);
ALTER table wms_storage_mat MODIFY column  wh_id BIGINT(20) null;
ALTER table wms_storage_mat MODIFY column  rg_id BIGINT(20) null;
ALTER table wms_storage_mat MODIFY column  pn_id BIGINT(20) null;